Corrected A 0.1 - 0.05- 0 0.05 0.1

{2} 2vΔ

0.004 -

0.002 -

0

0.002

0.004

ALICE

= 2.76 TeV NNs 30-40% Pb-Pb

c < 5.0 GeV/ Tp 0.2 <

< 0.8 η -0.8 <

/ndf = 1.29/8 2χ 0.00007 ± Intercept = 0.00015 0.002 ± Slope = 0.024